                             Dos Program Manager
                  Copyright:  01/16/1994 McKendry Products

                  Usage: DPM [<filename.ext> -i -m -c -h -? MM]

     Valid [Optional] Command line switches are:

 -m: Use monochrome shading mode for laptop computers.
 -c: Use color (overide DPM.CFG settings.  If the DPM.CFG file has
     the MONO line switch in it this can be used as a temporary
     overide without having to edit the DPM.CFG file.)
 -h:
 -?: Display help screen.
 -i: Program Information.
 MM: Set screen blanking time 0 = No screen blanking.
     Up to 60 minutes.  Overides settings in the DPM.CFG file.

     <filename.ext> - Use alternate Menu Screen file

     filename.ext and switches can be anywhere on the command line.



                          [Press any key to resume]
